24 January 2007 J3/07-135

Subject: UTI 5003 From: Van Snyder

1 Introduction 1 I don’t think there’s anything wrong with the description of a module procedure interface. It is modeled 2 on the description of the declaration of the interface of an external procedure. As with an external 3 procedure interface, the interface can be used as if it were an abstract interface even if no corresponding 4 external procedure exists in the program. The primary difference is the appearance of MODULE within 5 the prefix of the subroutine or function statement that introduces the interface body. This tells the 6 processor that it needs to combine the module name or submodule identifier with the subprogram name 7 in the same way that it would for a module procedure that is not a separate module procedure. This 8 combined name is not used, however, except in a procedure reference or when the procedure is used as 9 an actual argument or pointer assignment target. 10 Actually, the description of a generic or specific interface block is defective: it doesn’t make an exception 11 for separate module procedure interface bodies. 12 2 Edits 13 Edits refer to 07-007. Page and line numbers are displayed in the margin. Absent other instructions, a 14 page and line number or line number range implies all of the indicated text is to be replaced by associated 15 text, while a page and line number followed by + (-) indicates that associated text is to be inserted after 16 (before) the indicated line. Remarks are noted in the margin, or appear between [ and ] in the text. 17 [Editor: Replace “An interface body” by “If an interface body is not a module procedure interface body, 302:6 18 it”.] 19 [Editor: Delete UTI 5003.] 512:24+1- 20

24 January 2007 Page 1 of 1