26 June 2002 J3/02-216

Subject: Addressing comments in 02-209 concerning 02-174r2 From: Van Snyder

1 Edits 1 Edits refer to 02-007r2. Page and line numbers are displayed in the margin. Absent other 2 instructions, a page and line number or line number range implies all of the indicated text is to 3 be replaced by associated text, while a page and line number followed by + (-) indicates that 4 associated text is to be inserted after (before) the indicated line. Remarks are noted in the 5 margin, or appear between [ and ] in the text. 6 [The Editor found “suitable generic interface” to be a bizarre index entry (the \tdef macro 205:2 7 both emboldens its argument and puts it in the index). One possibility is to use the \tdeff 8 macro, which emboldens but doesn’t index. On reflection, however, the term “suitable generic 9 interface” is referenced only once, on the same page. Editor: disembolden “suitable generic 10 interface”.] 11 [The wording in 02-007r1, viz. “the variable specified,” was ambiguous: Which variable? The 217:8 12 revised wording, viz. “scalar-int-variable,” is incorrect: syntax terms don’t become defined. 13 We could make it even wordier by inserting “variable specified by” after “the”. Shortening 14 it by using a pronoun, which would be unambiguous in this case, would be better. Editor: 15 “scalar-int-variable . . . specifier” ⇒ “variable it specifies”.] 16 [The wording in 02-007r1, viz. “iomsg-variable,” is incorrect: syntax terms don’t become 217:10 17 defined. Putting “the” in front of it, to be parallel to [217:8], doesn’t help. As above, we could 18 make it wordier. Shortening it by using a pronoun, which would be unambiguous in this case, 19 would be better. Editor: “iomsg-variable” by “variable it specifies”. Compare to item (7).] 20 [The use of “scalar-int-variable,” is incorrect: syntax terms don’t become defined. As above, 217:11-12 21 we could make it wordier. If we just try to use a pronoun, it’s ambiguous: Does “it” refer to 22 the READ statement or the SIZE= specifier? But SIZE= specifiers can appear only in READ 23 statements. Editor: “the statement . . . becomes” ⇒ “a SIZE= specifier appears, the variable 24 it specifies becomes”.] 25

26 June 2002 Page 1 of 1